1RXS J175155.1-283753

GRS 1758-258

GX 5-1

GRS 1747-312

GX 3+1

SLX 1744-299 SLX 1744-300

GX+02,-0.2

1E 1743.1-2843

1A 1742-294

XTE J1739-285

SLX 1735-269

GX 1+4

GX 354-0

4U 1722-30