0 50 100 m 19.273

19.278

19.283

19.288

19.293

19.298

19.405

19.410

19.415

19.420

19.425

19.430

19.435

19.440

19.445

19.450

19.455

19.460

19.465

19.470

19.475

19.480

19.485

19.490

19.495

19.500

19.505

19.510

19.515

19.520

19.525

19.530

19.535

19.540

19.545

19.550

19.555

19.760

19.765

19.770

19.775

19.780

19.817

19.822

19.827

19.832

19.837

19.842

19.865

19.870

19.875

19.880

19.885

19.890

19.895

19.900

19.905

19.910

19.915

19.920

19.925

19.930

19.935

19.940

19.945

82.46 82.46

82.48 82.48

82.50 82.50

82.52 82.52

82.54 82.54

-62.60

-62.60

-62.50 -62.40

-62.40

-62.30 -62.20

-62.20

-62.10